1. Years of Experience: 8/10
2. Experience Summary: 10/10
3. Skills: 9/10
4. Role: 8/10
5. Role Type: 7/10
6. Domain/Industry: 6/10
7. Projects Executed: 9/10

Overall descriptive explanation for the information completeness factor:
- The resume provides a good amount of information on the candidate's years of experience, experience summary, skills, and projects executed.
- The role and role type sections are somewhat lacking in detail and could be more specific.
- The resume mentions some domain/industry knowledge, but it is not clearly defined.
- Overall, the resume provides a decent level of information, but there is room for improvement in certain sections.