1. Years of Experience: 6/10
2. Experience Summary: 8/10
3. Skills: 7/10
4. Role: 7/10
5. Role Type: 6/10
6. Domain/Industry: 5/10
7. Projects Executed: 6/10

Overall descriptive explanation for the information completeness factor:
- The resume provides a decent amount of information about the candidate's years of experience, experience summary, skills, and role.
- However, there is limited information about the role type and domain/industry knowledge.
- The projects executed section provides some information, but it could be more detailed.

Overall, the resume provides a moderate level of completeness in terms of the information provided. The candidate's experience and skills are well-highlighted, but there is room for improvement in providing more specific details about the role type and domain/industry knowledge.